import * as React from 'react';
import { HelpStoryWrapper } from './storyDecorator';

export default {
  title: 'Molecules/Help Page',
  decorators: [HelpStoryWrapper],
};

export const Base = () => (
  <>
    <h1>What is the world but vibrations?</h1>
    <p>Vibrations that synchronize and tie it together, running free forever.</p>
  </>
);
